Contents
         POW   v2.0

    QWK mail reader for Windows

© 1993-96 Gina Davis & GD Custom Software.

                 Installation

The opening dialog consists of a Text Box in which to put the directory where the main POW program files are to be installed, plus Standard, Custom, Exit Setup and Help buttons.

Buttons

Standard	Installs all files into the specified POW program directory, avoiding possible conflicts with other applications as far as possible.

Custom	Calls the Options Dialog where the user may choose the Windows or Windows/System directory for files that may be shared with other applications.

Exit Setup	Cancels the installation and returns to Windows.


Options Dialog

This contains two groups of options buttons to choose whether to install CMDIALOG.VBX & GRID.VBX into the POW program directory or Windows/System and the Spelling Checker files (SPELMATE.DLL and later the dictionaries) into the POW program directory or Windows.

When upgrading POW (by choosing to install into a directory containing a previous version), extra options are provided.  Check boxes allow for optional re-creation of POW Program Manager group and updating zip/unzip PIF files (overwriting existing files).  This is to cater for users who have altered their POW group or PIF settings and don't want them reset.

Buttons

Continue	Continues Installation into the specified directories.

Exit Setup	Cancels the installation and returns to Windows.